    Pool Configuration

    You can use this module to display a list of all currently
    configured network pools.

    From here, you have the option to:

    + Add Create a new network pool
    + Modify Modify the highlighted pool
    + Delete Delete the highlighted pool
    + View See a list of all (effective) hosts in the highlighted pool
    + Select Make the first highlighted pool the default (or focus) pool

    Add

    Click on the Add button to create a new network pool. The Network
    Pool Add window will appear.

    Modify

    Click on this button to modify a pool's configuration. A configured
    pool must be selected from the list. The Network Pool Modify window
    will appear.

    Delete

    Select one or more pools from the list and click on the Delete button 
    to remove the pool(s) from the recognized set of configured pools.
    Enlighten will prompt you to confirm your action.

    View

    Select one or more pools from the list and click on the View button
    to see a list of all (effective) hosts in the named network pool.
    If you have highlighted more than one selection, click on the Next
    button to view the hosts in the next selected pool.

    Select

    Clicking on the Select button to make the first highlighted pool the
    default (or focus) pool. Once a pool has been selected as a focus,
    all further Enlighten related action and inquiries will be performed
    on all hosts in that pool.
